<template>
  <view class="ComCss">
    <cardMoudule :cardData="data1" :required="false" title="总体概况"></cardMoudule>
    <cardMoudule :cardData="data2" :required="true" title="城市总体发展规划"></cardMoudule>
    <cardMoudule :cardData="data3" :required="false" title="经营区域及人口_经营区域(四至边界)"></cardMoudule>
    <cardMoudule :cardData="data4" :required="false" title="经营区域及人口_经营区域人口"></cardMoudule>
    <cardMoudule :cardData="data5" :required="true" title="管道燃气竞争对手及发展现状"></cardMoudule>
    <cardMoudule :cardData="data6" :required="false" title="管道燃气竞争对手及发展现状"></cardMoudule>
    <cardMoudule :cardData="data7" :required="true" title="气源保障与管网规划"></cardMoudule>
    <cardMoudule :cardData="data8" :required="false" title="建成区: 经营区域城市建成区"></cardMoudule>
    <cardMoudule :cardData="data9" :required="false" title="乡镇及农村:乡镇及农村区域"></cardMoudule>
    <cardMoudule :cardData="data10" :required="false" title="历史近4年和当前预算完成情况"></cardMoudule>
    <cardMoudule :cardData="data11" :required="false" title="能源市场分析_天燃气与各燃气经济价格对比表"></cardMoudule>
    <cardMoudule :cardData="data12" :required="false" title="能源市场分析_不同类型的客户选用燃料分析"></cardMoudule>
    <cardMoudule :cardData="data13" :required="false" title="市场开发团队建设状况"></cardMoudule>
  </view>
</template>

<script>
  import {
    data
  } from "../../../uni_modules/uview-ui/libs/mixin/mixin"
  import cardMoudule from "./cardMoudule.vue"
  export default {
    components: {
      cardMoudule
    },
    props: {

    },
    data() {
      return {
        data1: [{
            cardType: 1,
            required: true,
            title: '预算主体名称',
            value: "2023年玉林市城市总体规划",
            icon: "arrow-down"
          },
          {
            cardType: 1,
            required: false,
            title: '成立时间(年/月)',
            value: "2019年9月",
            icon: "calendar"
          },
          {
            cardType: 1,
            required: false,
            title: '与中燃合资时间(年/月)',
            value: "2019年9月",
            icon: "calendar"
          },
          {
            cardType: 1,
            required: false,
            title: '过渡气源通气时间(年/月)',
            value: "2019年9月",
            icon: "calendar"
          },
          {
            cardType: 1,
            required: true,
            title: '特许经营区域范围的行政区划(或与政府约定的经营区域范围)',
            value: "文本",
          },
          {
            cardType: 1,
            required: true,
            title: '经营区域面积(平方公里)',
            value: "176",
          },
          {
            cardType: 1,
            required: true,
            title: '经营区域城市建成区行政区划',
            value: "文本",
          },
          {
            cardType: 1,
            required: true,
            title: '居民管道燃气安装确认户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '经营区域城市建成区中压管网已覆盖户',
            value: "10",
          },
          {
            cardType: 1,
            required: true,
            title: '气化率%',
            value: "10",
          },
          {
            cardType: 1,
            required: true,
            title: '管网覆盖率%',
            value: "10",
          },
          {
            cardType: 1,
            required: true,
            title: '经营区域范围内，城市建成区以外的管网已覆盖的乡镇明细清单(填乡镇名字)',
            value: "文本",
          },
          {
            cardType: 1,
            required: true,
            title: '经营区域范国内，城市建成区以外的管网已覆盖的乡镇人口户数(户)',
            value: "文本",
          },
          {
            cardType: 1,
            required: true,
            title: '经营区域范围内，管网未盖、但符合集团投资标准乡镇清单(填乡镇名字)',
            value: "文本",
          },
          {
            cardType: 1,
            required: true,
            title: '经营区域范围内，管网未覆盖、但符合集团投资标准乡镇人口(户)',
            value: "文本",
          },
        ],
        data2: [{
          cardType: 2,
          required: true,
          title: '预算主体名称',
          value: "2023年玉林市城市总体规划",
          icon: "arrow-down"
        }],
        data3: [{
            cardType: 1,
            required: true,
            title: '东至',
            value: "100度",
          },
          {
            cardType: 1,
            required: true,
            title: '西至',
            value: "100度",
          },
          {
            cardType: 1,
            required: true,
            title: '南至',
            value: "100度",
          },
          {
            cardType: 1,
            required: true,
            title: '北至',
            value: "100度",
          }
        ],
        data4: [{
            cardType: 1,
            required: true,
            title: '经营区域范围内总人口(万人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '建成区常住人口(万人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '建成区常住人口(万户)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '建成区户均人口(人/户)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '乡镇常住人口(万人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '乡镇常住人口(万户)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '乡镇户均人口(人/户)',
            value: "100",
          }
        ],
        data5: [{
          cardType: 2,
          required: true,
          value: "2023年玉林市城市总体规划",
        }],
        data6: [{
            cardType: 3,
            required: true,
            title: '新户',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 2,
            required: true,
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 3,
            required: true,
            title: '老户',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 2,
            required: true,
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 3,
            required: true,
            title: '农村居民市场',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 2,
            required: true,
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 3,
            required: true,
            title: '工商户',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 2,
            required: true,
            value: "2023年玉林市城市总体规划",
          }
        ],
        data7: [{
          cardType: 2,
          required: true,
          title: '预算主体名称',
          value: "2023年玉林市城市总体规划",
          icon: "arrow-down"
        }],
        data8: [{
            cardType: 3,
            required: true,
            title: '新居民',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '老居民',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '商业(含公福)',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '工业',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '合计',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          }
        ],
        data9: [{
            cardType: 3,
            required: true,
            title: '新居民',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '老居民',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '商业(含公福)',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '工业',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          },
          {
            cardType: 3,
            required: true,
            title: '合计',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总规模户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计财务确认安装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计报装户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有点火通气户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '累计不可开发户数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '剩余可开发户数',
            value: "100",
          }
        ],
        data10: [{
            cardType: 3,
            required: true,
            title: '新建居民用户(含乡镇新房)_2023财年(预计)',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '总预算任务数',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '实际完成数',
            value: "100",
          }
        ],
        data11: [{
            cardType: 3,
            required: true,
            title: '民用天燃气(Nm3)',
            value: "2023年玉林市城市总体规划",
          },
          {
            cardType: 1,
            required: true,
            title: '平台热值(Kcal)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '市场价(元)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '折合1Nm3天燃气价格(元)',
            value: "100",
          }
        ],
        data12: [{
          cardType: 2,
          required: true,
          title: '预算主体名称',
          value: "2023年玉林市城市总体规划",
        }],
        data13: [{
            cardType: 1,
            required: true,
            title: '现有部门经理(人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有副经理(人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有主管(人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有业务员(人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有内勤(人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有其他人员(人)',
            value: "100",
          },
          {
            cardType: 1,
            required: true,
            title: '现有合计(人)',
            value: "100",
          },
        ],
      }
    },
    computed: {

    },
    onLoad() {

    },
    methods: {

    }
  }
</script>

<style lang="scss" scoped>
  
</style>
