UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '-1', NAME_ = '管理端菜单', ALIAS_ = 'manage_menu', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '{\"tabType\":\"border-card\"}', PATH_ = '-1.1.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '1';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '密码策略', ALIAS_ = 'pwdStrategy', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 7, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.1252430239427072000.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1252430239427072000';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '我的企业', ALIAS_ = 'tenantInfoManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.1253300488565297152.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1253300488565297152';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1', NAME_ = '应用中心', ALIAS_ = 'develop', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1254651824338767872';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1285866575999668224', NAME_ = '流程模块', ALIAS_ = 'sysModuleList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1285866575999668224.1254652102806999040.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1254652102806999040';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '定时计划', ALIAS_ = 'schedulerManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 6, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.1254652167239897088.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1254652167239897088';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441009', NAME_ = '租户管理', ALIAS_ = 'tenant', ACTIVE_TAB_ = 'tenantManager', MENU_ICON_ = '', OPENED_ = 1, SN_ = 7, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.1254667759887978496.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1254667759887978496';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1254667759887978496', NAME_ = '租户管理', ALIAS_ = 'tenantManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = NULL, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.1254667759887978496.1254667845808295936.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1254667845808295936';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1254667759887978496', NAME_ = '租户类型', ALIAS_ = 'tenantTypeManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.1254667759887978496.1254667902586589184.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1254667902586589184';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1254667759887978496', NAME_ = '租户参数扩展', ALIAS_ = 'tenantParamsManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.1254667759887978496.1254667968181309440.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1254667968181309440';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1314507998391046144', NAME_ = '创建视图', ALIAS_ = 'viewManageList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1314507998391046144.1255794414870204416.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1255794414870204416';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1254651824338767872', NAME_ = '代码生成', ALIAS_ = 'codeGenerator', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1257952481862881280.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1257952481862881280';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1257952481862881280', NAME_ = '开始生成', ALIAS_ = 'startGenerator', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1257952481862881280.1257957919274700800.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1257957919274700800';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1257952481862881280', NAME_ = '代码生成日志', ALIAS_ = 'generatorLog', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1257952481862881280.1257958081917227008.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1257958081917227008';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3391046', NAME_ = '数据建模', ALIAS_ = 'businessObj', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3391046.1258312908673257472.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1258312908673257472';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4171077', NAME_ = '打印记录', ALIAS_ = 'printRecordManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4171077.1264181442355793920.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1264181442355793920';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '5403008', NAME_ = '登录统计', ALIAS_ = 'loginLogManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.5403008.1273944053116964864.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1273944053116964864';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441002', NAME_ = '新闻公告', ALIAS_ = 'portalNewsNoticeManager', ACTIVE_TAB_ = NULL, MENU_ICON_ = NULL, OPENED_ = 1, SN_ = 4, TABS_STYLE_ = NULL, PATH_ = '-1.1.3441002.1278989818835111936.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '1278989818835111936';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1254651824338767872', NAME_ = '应用模块', ALIAS_ = 'applicationModule', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1285866575999668224.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1285866575999668224';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1254651824338767872', NAME_ = '企微钉钉', ALIAS_ = 'sysExternalUniteList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1285866673655648256.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1285866673655648256';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1285866575999668224', NAME_ = '移动端模块', ALIAS_ = 'appModelManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1285866575999668224.1285866737765584896.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1285866737765584896';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1314509331676401664', NAME_ = '附件存储配置', ALIAS_ = 'flowUploadProperties', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.1314509331676401664.1287308260197666816.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1287308260197666816';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3631013', NAME_ = '标签', ALIAS_ = 'sysTagManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3631013.1287643583943413760.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1287643583943413760';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3391046', NAME_ = '数据脱敏', ALIAS_ = 'portalDataSensitiveManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3391046.1287699251299749888.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1287699251299749888';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441009', NAME_ = '排班管理', ALIAS_ = 'scheduling', ACTIVE_TAB_ = 'shiftRuleManager', MENU_ICON_ = '', OPENED_ = 1, SN_ = 6, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.1290200609563217920.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1290200609563217920';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1290200609563217920', NAME_ = '法定假期', ALIAS_ = 'holidayManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.1290200609563217920.1290200842779103232.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1290200842779103232';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1290200609563217920', NAME_ = '轮班规则', ALIAS_ = 'shiftRuleManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.1290200609563217920.1290565469010530304.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1290565469010530304';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441030', NAME_ = '角色授权', ALIAS_ = 'roleManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441030.1290961424914452480.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '1290961424914452480';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441030', NAME_ = '关系矩阵', ALIAS_ = 'matrixManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441030.1290961558574338048.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '1290961558574338048';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1285866575999668224', NAME_ = 'pc模块', ALIAS_ = 'appCenter', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1285866575999668224.1296282423985836032.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1296282423985836032';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3761202', NAME_ = '流程水印', ALIAS_ = 'watermarkManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.3761202.1303147346326065152.', HREF_ = '', TENANT_ID_ = '-1' WHERE ID_ = '1303147346326065152';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '系统属性', ALIAS_ = 'sysPropertiesManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.13533023.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '13533023';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441002', NAME_ = '表单设计', ALIAS_ = 'form', ACTIVE_TAB_ = 'formManager', MENU_ICON_ = 'el-icon-menu', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '{\"tabType\":\"card\"}', PATH_ = '-1.1.3441002.3391046.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3391046';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3391046', NAME_ = 'pc表单', ALIAS_ = 'formManager', ACTIVE_TAB_ = NULL, MENU_ICON_ = 'el-icon-menu', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3391046.3391171.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3391171';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3391046', NAME_ = '手机表单', ALIAS_ = 'mobileFormManager', ACTIVE_TAB_ = NULL, MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3391046.3391194.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3391194';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1', NAME_ = '系统管理', ALIAS_ = 'system', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3421053';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '菜单管理', ALIAS_ = 'menuManagerRouter', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.3421056.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3421056';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '分类管理', ALIAS_ = 'sysTypeManager', ACTIVE_TAB_ = 'sysTypeTreeManager', MENU_ICON_ = '', OPENED_ = 1, SN_ = 8, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.3421057.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3421057';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1', NAME_ = '设计中心', ALIAS_ = 'designCenter', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3441002';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1', NAME_ = '用户中心', ALIAS_ = 'orgStructure', ACTIVE_TAB_ = '', MENU_ICON_ = 'icon-monitor', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '{\"tabType\":\"card\"}', PATH_ = '-1.1.3441009.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3441009';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441009', NAME_ = '组织管理', ALIAS_ = 'organization', ACTIVE_TAB_ = 'orgManager', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '{\"tabType\":\"card\"}', PATH_ = '-1.1.3441009.3441023.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3441023';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441009', NAME_ = '用户管理', ALIAS_ = 'ucManager', ACTIVE_TAB_ = 'userListManager', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '{\"tabType\":\"border-card\"}', PATH_ = '-1.1.3441009.3441027.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3441027';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441009', NAME_ = '角色管理', ALIAS_ = 'roleMatrixManager', ACTIVE_TAB_ = '', MENU_ICON_ = '21312312312412412412412312312312', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441030.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3441030';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441009', NAME_ = '汇报线', ALIAS_ = 'reportLine', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441036.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3441036';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441002', NAME_ = '元件管理', ALIAS_ = 'meta', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3631013.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3631013';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3631013', NAME_ = '流水号', ALIAS_ = 'identityManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3631013.3631015.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3631015';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3631013', NAME_ = '数据字典', ALIAS_ = 'dataDicManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3631013.3631059.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3631059';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3631013', NAME_ = '对话框', ALIAS_ = 'customDialogList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3631013.3641014.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3641014';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3631013', NAME_ = '关联查询', ALIAS_ = 'customQueryList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3631013.3641017.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3641017';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1', NAME_ = '流程中心', ALIAS_ = 'flow', ACTIVE_TAB_ = '三级菜单', MENU_ICON_ = '。。。。。', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3641025';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1314509331676401664', NAME_ = '附件列表', ALIAS_ = 'fileList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.1314509331676401664.3641034.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3641034';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441002', NAME_ = '门户设计', ALIAS_ = 'portal', ACTIVE_TAB_ = 'indexColumn', MENU_ICON_ = 'el-icon-menu', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3711006.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3711006';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421057', NAME_ = '分类管理', ALIAS_ = 'sysTypeTreeManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.3421057.3741197.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3741197';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421057', NAME_ = '分类标识', ALIAS_ = 'sysTypeCatManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.3421057.3741198.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3741198';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3641025', NAME_ = '流程设计', ALIAS_ = 'flowDesign', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.3761202.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3761202';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3761202', NAME_ = '流程定义', ALIAS_ = 'defManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.3761202.3761203.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3761203';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441002', NAME_ = '外部数据源', ALIAS_ = 'dataSourceManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3881278.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '3881278';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3641025', NAME_ = '任务调度', ALIAS_ = 'agent', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4073629.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4073629';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4073629', NAME_ = '任务代理', ALIAS_ = 'delegationManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4073629.4073653.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4073653';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4073629', NAME_ = '领导秘书', ALIAS_ = 'secretaryManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4073629.4077493.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4077493';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4073629', NAME_ = '任务移交', ALIAS_ = 'transferManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4073629.4079084.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4079084';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441023', NAME_ = '维度管理', ALIAS_ = 'demension', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '{\"tabType\":\"border-card\"}', PATH_ = '-1.1.3441009.3441023.4111002.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4111002';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441023', NAME_ = '组织管理', ALIAS_ = 'orgManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441023.4111004.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4111004';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441023', NAME_ = '职务管理', ALIAS_ = 'jobManage', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441023.4111005.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4111005';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441023', NAME_ = '岗位管理', ALIAS_ = 'postManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441023.4111006.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4111006';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441023', NAME_ = '组织参数管理', ALIAS_ = 'prgParamManage', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441023.4111008.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4111008';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3391046', NAME_ = '模板管理', ALIAS_ = 'formTemplateList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3391046.4151743.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4151743';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3641025', NAME_ = '实例管理', ALIAS_ = 'instance', ACTIVE_TAB_ = 'taskManager', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4171077.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4171077';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4171077', NAME_ = '实例管理', ALIAS_ = 'instanceManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4171077.4171091.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4171091';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4171077', NAME_ = '任务管理', ALIAS_ = 'taskManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4171077.4171096.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4171096';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3711006', NAME_ = '栏目管理', ALIAS_ = 'indexColumn', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3711006.4261374.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4261374';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3641025', NAME_ = '辅助功能', ALIAS_ = 'help', ACTIVE_TAB_ = 'approvalItemList', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4291768.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4291768';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '国际化', ALIAS_ = 'i18n', ACTIVE_TAB_ = 'i18nMessageTypeManager', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.4401042.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4401042';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4401042', NAME_ = '语种管理', ALIAS_ = 'i18nMessageTypeManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.4401042.4401044.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4401044';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4401042', NAME_ = '资源管理', ALIAS_ = 'i18nMessageManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.4401042.4401046.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4401046';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4291768', NAME_ = '常用语', ALIAS_ = 'approvalItemList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4291768.4501046.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4501046';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4291768', NAME_ = '消息模板', ALIAS_ = 'msgTemplateList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4291768.4501151.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4501151';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4291768', NAME_ = '人员脚本', ALIAS_ = 'conditionScriptList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4291768.4501153.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4501153';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '4291768', NAME_ = '常用脚本', ALIAS_ = 'scriptList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.4291768.4501154.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4501154';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3761202', NAME_ = '流程授权', ALIAS_ = 'flowAuthManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.3761202.4611943.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4611943';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441027', NAME_ = '用户中心', ALIAS_ = 'userListManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441027.4701007.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4701007';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441027', NAME_ = '用户参数管理', ALIAS_ = 'userParamManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.3441027.4701008.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '4701008';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3711006', NAME_ = '部门门户', ALIAS_ = 'layoutDistribution', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3711006.5171497.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5171497';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421056', NAME_ = '菜单管理', ALIAS_ = 'menuManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.3421056.5401645.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5401645';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421056', NAME_ = '接口列表', ALIAS_ = 'methodListManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.3421056.5401647.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5401647';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '5403008', NAME_ = '消息发送日志', ALIAS_ = 'messageSendLog', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.5403008.5402968.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5402968';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '5403008', NAME_ = '接口事件日志', ALIAS_ = 'flowInterfaceCllLog', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 4, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.5403008.5402974.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5402974';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '5403008', NAME_ = '日志配置', ALIAS_ = 'systemLogConfig', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.5403008.5402980.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5402980';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3421053', NAME_ = '系统日志', ALIAS_ = 'systemLog', ACTIVE_TAB_ = 'systemLogList', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.5403008.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5403008';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '5403008', NAME_ = '操作日志', ALIAS_ = 'systemLogList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.3421053.5403008.5403082.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5403082';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1254651824338767872', NAME_ = '图表应用', ALIAS_ = 'reportManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.5721367.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5721367';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '5721367', NAME_ = '流程图表', ALIAS_ = 'flowChartManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.5721367.5721376.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5721376';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1314507998391046144', NAME_ = '数据列表', ALIAS_ = 'customViewManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1314507998391046144.5721725.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '5721725';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3761202', NAME_ = '常用流程', ALIAS_ = 'bpmCommonDefList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 3, TABS_STYLE_ = '', PATH_ = '-1.1.3641025.3761202.6121070.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '6121070';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '5721367', NAME_ = '数据图表', ALIAS_ = 'customChartManager', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.5721367.6641519.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '6641519';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3711006', NAME_ = '默认门户', ALIAS_ = 'defaultLayout', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 2, TABS_STYLE_ = '', PATH_ = '-1.1.3441002.3711006.6907875.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '6907875';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '3441009', NAME_ = '分级组织', ALIAS_ = 'heiOrganization', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 5, TABS_STYLE_ = '', PATH_ = '-1.1.3441009.8351150.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '8351150';
UPDATE PORTAL_SYS_MENU SET PARENT_ID_ = '1314507998391046144', NAME_ = '表单列表', ALIAS_ = 'dataTemplateList', ACTIVE_TAB_ = '', MENU_ICON_ = '', OPENED_ = 1, SN_ = 1, TABS_STYLE_ = '', PATH_ = '-1.1.1254651824338767872.1314507998391046144.8603038.', HREF_ = NULL, TENANT_ID_ = '-1' WHERE ID_ = '8603038';
INSERT INTO PORTAL_SYS_MENU(ID_, PARENT_ID_, NAME_, ALIAS_, ACTIVE_TAB_, MENU_ICON_, OPENED_, SN_, TABS_STYLE_, PATH_, HREF_, TENANT_ID_) VALUES ('1314509331676401664', '3641025', '附件管理', 'fileManager', '', '', 1, 4, '', '-1.1.3641025.1314509331676401664.', '', '-1');
INSERT INTO PORTAL_SYS_MENU(ID_, PARENT_ID_, NAME_, ALIAS_, ACTIVE_TAB_, MENU_ICON_, OPENED_, SN_, TABS_STYLE_, PATH_, HREF_, TENANT_ID_) VALUES ('1314507998391046144', '1254651824338767872', '数据应用', 'dataManager', '', '', 1, 1, '', '-1.1.1254651824338767872.1314507998391046144.', '', '-1');
